/*
 Navicat Premium Data Transfer

 Source Server         : 172.16.2.122
 Source Server Type    : MySQL
 Source Server Version : 50731
 Source Host           : 172.16.2.122:3306
 Source Schema         : MiniGame

 Target Server Type    : MySQL
 Target Server Version : 50731
 File Encoding         : 65001

 Date: 01/04/2021 18:22:40
*/

SET NAMES utf8mb4;
SET FOREIGN_KEY_CHECKS = 0;

-- ----------------------------
-- Table structure for serverinfo
-- ----------------------------
DROP TABLE IF EXISTS `serverinfo`;
CREATE TABLE `serverinfo`  (
  `userVersion` int(10) NULL DEFAULT NULL
) ENGINE = InnoDB CHARACTER SET = utf8mb4 COLLATE = utf8mb4_general_ci COMMENT = '当前的用户数据版本' ROW_FORMAT = Dynamic;

SET FOREIGN_KEY_CHECKS = 1;
